16:18:08.0

16:18:02.0

17:56.0

26:00.0

30.0

-15:27:00.0

28:00.0

29:00.0

RA (J2000)

Dec (J2000)

OBSID 00287421000 / DATE-OBS 2007-08-10T19:56:34.4

UVOT Finding Chart