40.0

3:52:30.0

20.0

57:30.0

-55:58:00.0

30.0

59:00.0

-56:00:00.0

RA (J2000)

Dec (J2000)

OBSID 00299787000 / DATE-OBS 2007-12-27T20:17:01.5

UVOT Finding Chart