10.0

22:37:00.0

36:50.0

54:30.0

55:00.0

30.0

-64:56:00.0

57:00.0

RA (J2000)

Dec (J2000)

OBSID 00301578000 / DATE-OBS 2008-01-23T04:23:50.9

UVOT Finding Chart