34:00.0

6:33:00.0

32:00.0

55:00.0

62:50:00.0

45:00.0

40:00.0

RA (J2000)

Dec (J2000)

OBSID 00302506000 / DATE-OBS 2008-02-05T07:59:31.1

UVOT Finding Chart