18:14:48.0

18:14:42.0

18:14:36.0

03:30.0

04:00.0

30.0

-24:05:00.0

06:00.0

RA (J2000)

Dec (J2000)

OBSID 00303172000 / DATE-OBS 2008-02-13T14:23:16.9

UVOT Finding Chart