55.0

11:51:50.0

45.0

40.0

05:00.0

30.0

-53:06:00.0

07:00.0

RA (J2000)

Dec (J2000)

OBSID 00303631000 / DATE-OBS 2008-02-19T00:12:10.7

UVOT Finding Chart