15:13:00.0

54.0

12:48.0

40:30.0

41:00.0

30.0

-14:42:00.0

43:00.0

RA (J2000)

Dec (J2000)

OBSID 00304379000 / DATE-OBS 2008-02-29T17:21:02.8

UVOT Finding Chart