6:38:30.0

6:38:00.0

6:37:30.0

05:00.0

24:00:00.0

55:00.0

23:50:00.0

RA (J2000)

Dec (J2000)

OBSID 00306793000 / DATE-OBS 2008-03-19T17:19:38.4

UVOT Finding Chart