30.0

5:22:00.0

21:00.0

40:00.0

35:00.0

47:30:00.0

25:00.0

RA (J2000)

Dec (J2000)

OBSID 00307931000 / DATE-OBS 2008-03-28T08:06:42.2

UVOT Finding Chart