08.0

04.0

11:17:00.0

30.0

38:00.0

30:37:00.0

36:00.0

RA (J2000)

Dec (J2000)

OBSID 00308041000 / DATE-OBS 2008-03-30T03:57:42.5

UVOT Finding Chart