24.0

5:37:20.0

16.0

12.0

30.0

06:00.0

5:05:00.0

04:00.0

03:30.0

RA (J2000)

Dec (J2000)

OBSID 00308812000 / DATE-OBS 2008-04-09T01:39:22.2

UVOT Finding Chart