33:00.0

31:30.0

2:30:00.0

10:00.0

15:00.0

-71:20:00.0

25:00.0

RA (J2000)

Dec (J2000)

OBSID 00309010000 / DATE-OBS 2008-04-11T22:25:36.5

UVOT Finding Chart