38.0

34.0

21:44:30.0

56:30.0

57:00.0

30.0

-19:58:00.0

59:00.0

RA (J2000)

Dec (J2000)

OBSID 00309111000 / DATE-OBS 2008-04-13T08:53:29.7

UVOT Finding Chart