11:46:25.0

11:46:05.0

45:50.0

30.0

05:00.0

68:04:00.0

03:00.0

02:00.0

RA (J2000)

Dec (J2000)

OBSID 00313087000 / DATE-OBS 2008-06-03T19:39:27.4

UVOT Finding Chart