11:35:18.0

11:35:12.0

11:35:06.0

05:00.0

30.0

-7:06:00.0

07:00.0

08:00.0

RA (J2000)

Dec (J2000)

OBSID 00313954000 / DATE-OBS 2008-06-13T11:27:15.2

UVOT Finding Chart