18:18:40.0

18:18:00.0

17:30.0

-6:50:00.0

55:00.0

-7:00:00.0

05:00.0

RA (J2000)

Dec (J2000)

OBSID 00317662000 / DATE-OBS 2008-07-23T04:35:28.9

UVOT Finding Chart