10.0

20:57:00.0

50.0

56:40.0

25:00.0

30.0

26:00.0

-62:27:00.0

28:00.0

RA (J2000)

Dec (J2000)

OBSID 00319036000 / DATE-OBS 2008-08-05T07:42:51.6

UVOT Finding Chart