20.0

10.0

5:47:00.0

30.0

17:00.0

51:16:00.0

15:00.0

14:30.0

RA (J2000)

Dec (J2000)

OBSID 00323542000 / DATE-OBS 2008-09-03T01:33:47.1

UVOT Finding Chart