30.0

2:39:20.0

10.0

21:00.0

61:20:00.0

19:00.0

18:30.0

RA (J2000)

Dec (J2000)

OBSID 00324362000 / DATE-OBS 2008-09-10T13:07:53.3

UVOT Finding Chart