19:13:40.0

19:13:32.0

24.0

30.0

51:00.0

25:50:00.0

49:00.0

RA (J2000)

Dec (J2000)

OBSID 00325707000 / DATE-OBS 2008-09-23T22:03:59.8

UVOT Finding Chart