42.0

38.0

34.0

8:07:30.0

2:20:00.0

30.0

19:00.0

18:00.0

17:00.0

RA (J2000)

Dec (J2000)

OBSID 00332851000 / DATE-OBS 2008-10-28T00:28:24.3

UVOT Finding Chart