22:04:00.0

22:03:00.0

35:00.0

-54:40:00.0

45:00.0

50:00.0

RA (J2000)

Dec (J2000)

OBSID 00334112000 / DATE-OBS 2008-11-09T07:16:35.5

UVOT Finding Chart