10.0

21:34:00.0

44:00.0

30.0

48:43:00.0

42:00.0

41:00.0

RA (J2000)

Dec (J2000)

OBSID 00335647000 / DATE-OBS 2008-11-26T21:39:02.5

UVOT Finding Chart