21:52:28.0

21:52:20.0

14.0

47:30.0

48:00.0

30.0

49:00.0

-33:50:00.0

RA (J2000)

Dec (J2000)

OBSID 00337115000 / DATE-OBS 2008-12-11T11:50:07.6

UVOT Finding Chart