1:03:50.0

1:03:10.0

02:30.0

25:00.0

-24:30:00.0

35:00.0

40:00.0

RA (J2000)

Dec (J2000)

OBSID 00337889000 / DATE-OBS 2008-12-21T16:26:05.3

UVOT Finding Chart