2:38:00.0

54.0

37:48.0

52:00.0

30.0

51:00.0

30:50:00.0

49:00.0

RA (J2000)

Dec (J2000)

OBSID 00338338000 / DATE-OBS 2008-12-28T01:19:06.0

UVOT Finding Chart