22:00.0

21:00.0

11:20:00.0

45:00.0

-61:50:00.0

55:00.0

-62:00:00.0

RA (J2000)

Dec (J2000)

OBSID 00339853000 / DATE-OBS 2009-01-13T18:55:06.7

UVOT Finding Chart