15:51:05.0

15:50:55.0

45.0

16:30.0

17:00.0

30.0

-54:18:00.0

19:00.0

RA (J2000)

Dec (J2000)

OBSID 00341114000 / DATE-OBS 2009-01-25T22:00:46.7

UVOT Finding Chart