14:43:50.0

14:43:42.0

34.0

-27:50:00.0

30.0

51:00.0

52:00.0

53:00.0

RA (J2000)

Dec (J2000)

OBSID 00342121000 / DATE-OBS 2009-02-05T23:04:51.1

UVOT Finding Chart