10.0

12:14:00.0

48:30.0

49:00.0

30.0

-48:50:00.0

51:00.0

RA (J2000)

Dec (J2000)

OBSID 00345777000 / DATE-OBS 2009-03-08T18:03:39.7

UVOT Finding Chart