08.0

04.0

21:18:00.0

54:00.0

30.0

1:53:00.0

52:00.0

51:30.0

RA (J2000)

Dec (J2000)

OBSID 00347744000 / DATE-OBS 2009-03-27T19:01:28.4

UVOT Finding Chart