28.0

24.0

6:20:20.0

16.0

-8:57:00.0

30.0

58:00.0

59:00.0

-9:00:00.0

RA (J2000)

Dec (J2000)

OBSID 00348152000 / DATE-OBS 2009-04-01T08:40:23.0

UVOT Finding Chart