15:57:00.0

56.0

56:52.0

30.0

32:00.0

31:00.0

35:30:00.0

RA (J2000)

Dec (J2000)

OBSID 00348428000 / DATE-OBS 2009-04-04T16:01:44.6

UVOT Finding Chart