24.0

17:55:20.0

16.0

30.0

41:00.0

20:40:00.0

39:00.0

38:30.0

RA (J2000)

Dec (J2000)

OBSID 00348781000 / DATE-OBS 2009-04-09T03:43:19.9

UVOT Finding Chart