13:08:00.0

40.0

07:20.0

34:30.0

35:00.0

30.0

-75:36:00.0

37:00.0

38:00.0

RA (J2000)

Dec (J2000)

OBSID 00349592000 / DATE-OBS 2009-04-19T13:48:20.8

UVOT Finding Chart