28.0

24.0

12:36:20.0

16.0

59:00.0

30.0

32:58:00.0

57:00.0

RA (J2000)

Dec (J2000)

OBSID 00350479000 / DATE-OBS 2009-04-26T12:53:52.9

UVOT Finding Chart