18.0

14.0

22:14:10.0

35:00.0

30.0

-26:36:00.0

37:00.0

RA (J2000)

Dec (J2000)

OBSID 00351588000 / DATE-OBS 2009-05-10T00:28:14.3

UVOT Finding Chart