20.0

8:00:00.0

40.0

7:59:20.0

55:00.0

0:50:00.0

45:00.0

40:00.0

RA (J2000)

Dec (J2000)

OBSID 00352420000 / DATE-OBS 2009-05-18T01:56:06.2

UVOT Finding Chart