58.0

54.0

14:09:50.0

46.0

29:00.0

30.0

24:28:00.0

27:00.0

26:30.0

RA (J2000)

Dec (J2000)

OBSID 00353540000 / DATE-OBS 2009-05-29T14:27:22.5

UVOT Finding Chart