10.0

0:44:00.0

43:50.0

30.0

59:00.0

61:58:00.0

57:00.0

56:30.0

RA (J2000)

Dec (J2000)

OBSID 00355303000 / DATE-OBS 2009-06-21T04:24:50.6

UVOT Finding Chart