21:14:10.0

21:13:55.0

45.0

30.0

36:00.0

62:35:00.0

34:00.0

RA (J2000)

Dec (J2000)

OBSID 00356516000 / DATE-OBS 2009-07-05T05:25:59.6

UVOT Finding Chart