21:05:00.0

21:03:30.0

65:00:00.0

55:00.0

64:50:00.0

45:00.0

RA (J2000)

Dec (J2000)

OBSID 00358520000 / DATE-OBS 2009-07-27T22:43:54.6

UVOT Finding Chart