52.0

46.0

12:38:40.0

23:00.0

30.0

-15:24:00.0

25:00.0

26:00.0

RA (J2000)

Dec (J2000)

OBSID 00358760000 / DATE-OBS 2009-07-31T12:47:43.5

UVOT Finding Chart