54.0

23:32:50.0

46.0

42.0

34:30.0

35:00.0

30.0

-10:36:00.0

37:00.0

RA (J2000)

Dec (J2000)

OBSID 00359711000 / DATE-OBS 2009-08-12T06:07:12.1

UVOT Finding Chart