6:43:40.0

6:43:30.0

14:00.0

30.0

13:00.0

50:12:00.0

11:00.0

10:30.0

RA (J2000)

Dec (J2000)

OBSID 00361830000 / DATE-OBS 2009-09-04T01:03:33.3

UVOT Finding Chart