18:18:44.0

18:18:38.0

32.0

01:30.0

02:00.0

30.0

-17:03:00.0

04:00.0

RA (J2000)

Dec (J2000)

OBSID 00361958000 / DATE-OBS 2009-09-05T11:29:53.7

UVOT Finding Chart