2:08:50.0

40.0

31:30.0

32:00.0

30.0

-57:33:00.0

34:00.0

RA (J2000)

Dec (J2000)

OBSID 00373172000 / DATE-OBS 2009-10-18T20:53:05.4

UVOT Finding Chart