13:55:10.0

13:55:02.0

54:54.0

26:00.0

30.0

47:25:00.0

24:00.0

23:30.0

RA (J2000)

Dec (J2000)

OBSID 00374875000 / DATE-OBS 2009-11-04T08:54:25.3

UVOT Finding Chart