3:43:50.0

3:43:20.0

3:42:50.0

20:00.0

15:00.0

23:10:00.0

05:00.0

RA (J2000)

Dec (J2000)

OBSID 00380311000 / DATE-OBS 2009-12-21T20:54:17.1

UVOT Finding Chart