18.0

14.0

3:43:10.0

06.0

16:00.0

30.0

23:15:00.0

14:00.0

13:00.0

RA (J2000)

Dec (J2000)

OBSID 00380311000 / DATE-OBS 2009-12-21T20:57:49.4

UVOT Finding Chart